COA Presentation, 19 February 1998 14

Example 2: Accept all sequences with balanced

parenthesis.

( ( ) ( ( ) ( ) ( ) ( )

To check the sequences you need to build a device with memory: a Stack.

Put a plate on the stack if you see a left paren ( and take a plate off the stack if you see a right paren ).

If there are no plates left on the stack at the end of scanning the sequence, then sequence is ok.